RunningOnMinGW
==============

MLton runs on http://mingw.org[MinGW], a library for porting Unix
applications to Windows.  Some library functionality is missing or
changed.

== Notes ==

* To compile MLton on MinGW:
** The <:GnuMP:> library is required.
** The Bash shell is required.  If you are using a prebuilt MSYS, you
probably want to symlink `bash` to `sh`.

== Known issues ==

* Many functions are unimplemented and will `raise SysErr`.
** `MLton.Itimer.set`
** `MLton.ProcEnv.setgroups`
** `MLton.Process.kill`
** `MLton.Process.reap`
** `MLton.World.load`
** `OS.FileSys.readLink`
** `OS.IO.poll`
** `OS.Process.terminate`
** `Posix.FileSys.chown`
** `Posix.FileSys.fchown`
** `Posix.FileSys.fpathconf`
** `Posix.FileSys.link`
** `Posix.FileSys.mkfifo`
** `Posix.FileSys.pathconf`
** `Posix.FileSys.readlink`
** `Posix.FileSys.symlink`
** `Posix.IO.dupfd`
** `Posix.IO.getfd`
** `Posix.IO.getfl`
** `Posix.IO.getlk`
** `Posix.IO.setfd`
** `Posix.IO.setfl`
** `Posix.IO.setlkw`
** `Posix.IO.setlk`
** `Posix.ProcEnv.ctermid`
** `Posix.ProcEnv.getegid`
** `Posix.ProcEnv.geteuid`
** `Posix.ProcEnv.getgid`
** `Posix.ProcEnv.getgroups`
** `Posix.ProcEnv.getlogin`
** `Posix.ProcEnv.getpgrp`
** `Posix.ProcEnv.getpid`
** `Posix.ProcEnv.getppid`
** `Posix.ProcEnv.getuid`
** `Posix.ProcEnv.setgid`
** `Posix.ProcEnv.setpgid`
** `Posix.ProcEnv.setsid`
** `Posix.ProcEnv.setuid`
** `Posix.ProcEnv.sysconf`
** `Posix.ProcEnv.times`
** `Posix.ProcEnv.ttyname`
** `Posix.Process.exece`
** `Posix.Process.execp`
** `Posix.Process.exit`
** `Posix.Process.fork`
** `Posix.Process.kill`
** `Posix.Process.pause`
** `Posix.Process.waitpid_nh`
** `Posix.Process.waitpid`
** `Posix.SysDB.getgrgid`
** `Posix.SysDB.getgrnam`
** `Posix.SysDB.getpwuid`
** `Posix.TTY.TC.drain`
** `Posix.TTY.TC.flow`
** `Posix.TTY.TC.flush`
** `Posix.TTY.TC.getattr`
** `Posix.TTY.TC.getpgrp`
** `Posix.TTY.TC.sendbreak`
** `Posix.TTY.TC.setattr`
** `Posix.TTY.TC.setpgrp`
** `Unix.kill`
** `Unix.reap`
** `UnixSock.fromAddr`
** `UnixSock.toAddr`
